\vspace*{\fill}
\begin{flushleft}
Copyright (C) 2008 Howard Hughes Medical Institute.

\vspace{2em} 

Easel's source code and documentation are freely redistributable and
modifiable under the terms of the Janelia Farm Software License.
\end{flushleft}








